{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":10,"decimals":0},{"name":"Nom","type":"character","width":254},{"name":"Façade","type":"character","width":254},{"name":"Lat","type":"number","width":24,"decimals":15},{"name":"Latitude","type":"character","width":254},{"name":"Long","type":"number","width":24,"decimals":15},{"name":"Longitude","type":"character","width":254},{"name":"Début des","type":"character","width":254},{"name":"Prof.","type":"character","width":254},{"name":"Types de c","type":"character","width":254},{"name":"Types de_1","type":"character","width":254},{"name":"Mesures co","type":"character","width":254},{"name":"Mesures _1","type":"character","width":254},{"name":"En cours d","type":"character","width":254},{"name":"Proximité","type":"character","width":254}],"n_rows":12,"rows_kept":12,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[1,"EOL","Méditerranée",43.681666999999997,"43°40?54 N",7.319444444444450,"7°19?10 E","oct-14","0 ? 80 m","SeaBird SBE137 : T, P, S","WETLABS ECO FLNT : Fluo, Turb.","Seabird SBE43 : O2 dissous","Station météo (non qualifiée Météo-France)",null,"MOOSE, PHYTOBS, SOMLIT, SONEL"]
[2,"SOLEMIO","Méditerranée",43.281666700000002,"43°16'54 N",5.338055555555555,"5°20'17 E","mai-13","0-50 m","NKE SMATCH : T, P, S, Turb.","Profileur NKE PROVOR","Turner Designs : Fluo.","Aanderaa optique : O2 dissous",null,"MOOSE, PHYTOBS, SOMLIT"]
[3,"MESURHO","Méditerranée",43.320277800000000,"43°19'13 N",4.870277777777777,"4°51'73 E","mai-09","Aérien(10m), 2-18 m","NKE SMATCH : T, S, P, O2 dissous, Turb., Fluo.","ADCP 600kHz RDI : courants, vagues, T, P","Waisala WXT510 : Vent, P atm., Précipitation, Humidité Rel.","Sky quantum : PAR","EcoTriplet : Turb, Fluo, CDOM","DYNALIT, MOOSE,SONEL"]
[4,"BESSète","Méditerranée",43.334166699999997,"43°20?03 N",3.643888888888889,"3°38?38 E","2009 discontinu","27 m (2009-2017), 2 m (2017-?)","Sonde NKE : T, S","Sonde YSI : T, P, S, O2 dissous, Turb., Fluo.","ADCP RDI 600 kHz + wave module",null,null,"DYNALIT, PHYTOBS, SOMLIT, SONEL"]
[5,"POEM","Méditerranée",42.706944399999998,"42°42?25 N",3.067500000000000,"3°04?03 E","2009","28 m","YSI EXO2 : T, S, P, O2 dissous, Turb., Fluo.",null,null,null,null,"PHYTOBS, MOOSE"]
[6,"SOLA","Méditerranée",42.491666700000003,"42°29'30 N",3.152777777777778,"3°08'70 E","2010","27 m","CTD Seabird SBE61plus : T, P, S","ECO FLNTU WETLabs : Fluo., Turb.",null,null,null,"MOOSE, SONEL, SOMLIT, PHYTOBS"]
[7,"Arcachon","Atlantique",44.633333299999997,"44°38?00 N",-1.233333333333333,"1°14?00 W","oct-17","1,7 m","NKE Smatch : T, S, P, Turb., Fluo.",null,null,null,null,"DYNALIT, PHYTOBS, SOMLIT, SONEL"]
[9,"SMART","Rade de Brest",48.318333299999999,"48°19'06\"N",-4.335833333333333,"4°20'09\"W","mars-16","4m","NKE STPS : T, S, P","Wetlab ECO FLNTU : Turb, Fluo","  SeaFET : pH",null,null,"DYNALIT, PHYTOBS, SOMLIT, SONEL"]
[10,"MAREL-Iroise","Atlantique",48.363333300000001,"48°21?48 N",-4.559166666666666,"4°33?33 W","juil-00","2 m","NKE MP7 : T, S, P, O2 dissous, Turb., Fluo., pH",null,"Seabird PAR Satlantic : mesure PAR","CARIOCA : CO2 dissous",null,"DYNALIT, PHYTOBS, SOMLIT, SONEL"]
[12,"SMILE","Manche",49.350833299999998,"49°20'63 N",-0.312222222222222,"0°18'44 W","2015","1m","NKE MP7 : T, S, P, O2 dissous, Turb., Fluo.","Capteur Production Primaire FRRF/Chelsea Instruments","Seabird PAR Satlantic : mesure PAR","Station Météo","Auto-analyseur de sels nutritifs Systea/Wizz, Capteur de nitrate optique TRIOS/Opus, Courantomètre et capteur Turb. de fond","DYNALIT, PHYTOBS, SOMLIT"]
[13,"SCENES","Manche",49.701111099999999,"49°28?844 N",0.275555555555556,"0°1?932 E","oct-17","15 m","Seabird Coastal HYDROCAT-O2n : T, P, S, O2 dissous,","FLNTU Wetlabs : Turb. et fluorescence,","ADCP, Station Météo",null,"Fluorescence multi-spectrale","DYNALIT, SONEL"]
[14,"MAREL-Carnot","Manche",50.753055600000003,"50°44'71 N",1.586388888888889,"1°34'18 E","mars-04","1 m","NKE MP6 : T, S, P, O2 dissous, Turb., Fluo (depuis 2014)[2]","Seabird PAR Satlantic : mesure PAR","Station météo","Auto-analyseur de sels nutritifs Systea/Wizz",null,"PHYTOBS, SOMLIT, SONEL"]